AMAL Concentric Float Bowl Gasket – BSA, Norton, Triumph, Matchless & AJS

Concentric Float Bowl Gasket

for

AMAL – Series 600 – 900

Also known as Float Bowl Chamber Washer by AMAL.

FITS:

Triumph, BSA, Norton,

Matchless & AJS models

Will fit 24mm, 26mm, 28mm, 30mm,

& 32mm concentric carburetors

Part #:    RG-622/073

OEM #:  622/073, 99-0514 & 19-3106

Set of 2 gaskets

Gaskets made of Viton – 1/16″ thick.

** NEW & IMPROVED **

This gasket is made of Viton which has an excellent resistance

to oils, fuels, lubricants, and most mineral acids.

Viton provides excellent performance in high temperature environments.

Does not swell up.

Reusable.

INSTALLATION INSTRUCTIONS:

For best results use thread locking compound on screw threads.

Do not over tighten!

Proudly made in the USA.

The post AMAL Concentric Float Bowl Gasket – BSA, Norton, Triumph, Matchless & AJS appeared first on Silicone Gaskets - Real Gaskets Tennessee.