NORTON Commando Outer Primary Cover Gasket for 1975 850cc

OUTER PRIMARY COVER GASKET – SILICONE

fits

NORTON  – COMMANDO  850 cc

–   Our silicone rubber gaskets are made from aerospace mechanical

grade AMS silicone and designed to withstand temperatures

up to 400 degrees Fahrenheit.

–   Therefore, they will not break down and deform or crack up

like cork or neoprene.

–   Our gaskets seal uneven and warped surfaces,

and eliminate corrosion.

–   Gaskets are 100% reusable.

Fits:

All models of Norton Commando 850 Mk III

Norton Commando MK III  Hi-Rider 850            1975

Norton Commando MK III  Interstate 850         1975 – 1977

Norton Commando MK III  Roadster 850           1975 – 1977

PART#:      RG-06-5534

One silicone gasket – 1/32″ thick  (This is a thin gasket)

Corresponding part #: Norton OEM 06-5534

Reusable.

~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

INSTALLATION INSTRUCTIONS:

Clean and dry all metal surfaces.

Remove all traces of oil.

Install gasket  “DRY”.

TORQUE   8-15 inch pounds.

DO NOT OVER TIGHTEN.

If the gasket bulges or “pooches” out then

you are over tightening – back off on the torque.

It is okay to use Loctite on the bolts.

TO REUSE GASKET:

Wash gasket briefly in hot soapy water.

Rinse well and dry all surfaces thoroughly.

Re-install gasket using the above installation instructions.

Proudly made in the USA.

~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

Download Instructions

The post NORTON Commando Outer Primary Cover Gasket for 1975 850cc appeared first on Silicone Gaskets - Real Gaskets Tennessee.