Timing Cover Gasket – Norton Commando

TIMING COVER GASKET

for

NORTON COMMANDO

750 & 850 cc

1962 and UP

PART#:   RG-06-1092

One gasket

Made of NI-2085 material – 1/32” thick

Now using new and improved material.

Gasket is made of NI-2085 Performance Material – 1/32″ thickness

NI–2085 has a nitrile butadiene rubber binder for resistance to water,

coolant, oil and fuel.

It has excellent strength and seal-ability characteristics.

This is not a silicone gasket.

~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

INSTALLATION INSTRUCTIONS:

Clean and dry all surfaces.

Install gasket.

Tighten to manufacturers specifications.

Proudly made in the USA.

~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

The post Timing Cover Gasket – Norton Commando appeared first on Silicone Gaskets - Real Gaskets Tennessee.