Oil Tank Cap Seal – Norton Commando

OIL TANK CAP SEAL – SILICONE

for

NORTON COMMANDO

–   Our silicone rubber gaskets are made from aerospace mechanical

grade AMS silicone and therefore designed to withstand

temperatures up to 400 degrees Fahrenheit.

–   Therefore, they will not break down and deform or crack up

like cork or neoprene.

–   Also, our gaskets seal uneven and warped surfaces, and

eliminates corrosion.

–   In addition, the silicone gaskets are 100% reusable.

~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

Oil Tank Cap Seal

also called Oil Filler Cap Gasket

or Oil Tank Cap Gasket Seal Washer

Part #:  Norton-2

PLEASE NOTE THAT WE HAVE ADJUSTED THIS GASKET

TO MAKE IT FIT EVEN BETTER!

SILICONE SEAL – 3/32″ THICK  (NOW THINNER)

OD – 1 7/8″   x   ID  – 1 5/16″

INSTALL DRY.

One gasket

Reusable

PROUDLY MADE IN THE USA.

The post Oil Tank Cap Seal – Norton Commando appeared first on Silicone Gaskets - Real Gaskets Tennessee.