Valve Cover Gasket Set – Norton Twins 600 – 850CC

Valve Cover Set – Silicone

fits

Norton “Twins” 600-850 cc

–   Our silicone rubber gaskets are made from aerospace mechanical

grade AMS silicone and designed to withstand temperatures up

to 400 degrees Fahrenheit.

–   Therefore, they will not break down and deform or crack up

like cork or neoprene.

–   Our gaskets seal uneven and warped surfaces,

and eliminate corrosion.

–   Gaskets are 100% reusable.

Fits:  NORTON “TWINS”

–   All models of NORTON Commando and Atl 600 – 850 CC

–   Years: 1962 – 1977 & 2005

Part #:      NORTON-1

Set of three (3) silicone gaskets.

Set consists of:

one (1) Inlet Valve Cover gasket (part # 06-7551)

and

two (2) Exhaust Valve Cover gaskets (part # 06-7554)

Gaskets are 1/16″ thick silicone

Reusable.

INSTALLATION INSTRUCTIONS:

Clean and dry all metal services.

Remove all traces of oil.

Install gasket “DRY”.

TORQUE 2 HOLE GASKET –  15 inch pounds

TORQUE SINGLE HOLE COVER – 15-18 inch pounds

Do not over tighten.

If the gaskets starts to bulge or “pooch” out then

back off on the torque.

TO  REUSE GASKET:

Wash briefly in hot soapy water.

Rinse well and dry thoroughly.

Reinstall using the above installation instructions.

Proudly made in the USA.

The post Valve Cover Gasket Set – Norton Twins 600 – 850CC appeared first on Silicone Gaskets - Real Gaskets Tennessee.