Fuel Cap Gasket – BSA, Norton, Willy’s CJ2A Jeep – 2 1/2″ OD x 1 5/8″ ID x 1/8″ thick

Fuel Cap or Gas Cap Gasket for BSA

also fits Norton Commandos 1969 – 1975

1946 Willy’s CJ2A Jeep

Part #: BSA-FCG

OEM #:   06-7102

Size:   2 1/2″ OD  X   1 5/8″ ID  X 1/8″ thickness

Fits:   BSA, Norton, Willy’s CJ2A Jeep

1 gasket

Please measure your gasket to be sure this is

the correct fuel cap gasket that will fit your fuel cap.

** NEW & IMPROVED **

This gasket is made of  Viton  which has an excellent resistance

to oils, fuels, lubricants, and most mineral acids.

Viton provides excellent performance in high temperature

environments.

Does not swell up.

Reusable.

Proudly made in the USA.

The post Fuel Cap Gasket – BSA, Norton, Willy’s CJ2A Jeep – 2 1/2″ OD x 1 5/8″ ID x 1/8″ thick appeared first on Silicone Gaskets - Real Gaskets Tennessee.