Intake Manifold Gasket – Triumph, BSA & Norton

Intake Manifold Gasket for single carburetor

fits

Triumph, BSA and Norton

Years:  1963 and up

Fits:     Triumph     650cc – T120, TR6

750cc – T140, TR7

BSA A65L

Norton

Part #:  RG-71-1430

Corresponding part #’s:  70-5660, 70-3334, 71-1430

Set of 2 gaskets

NEW & IMPROVED!

Now using new and improved material.

Gasket is made of  Interface Performance material NI-2085 – 1/32″ thickness

NI–2085 has a nitrile butadiene rubber binder for resistance to water, coolant,

oil and fuel.

It has excellent strength and seal-ability characteristics.

Proudly made in the USA.

The post Intake Manifold Gasket – Triumph, BSA & Norton appeared first on Silicone Gaskets - Real Gaskets Tennessee.