Fuel Cap Gasket for Triumph-BSA-Matchless-Norton-Ariel-AJS/AMC-Royal Enfield-Sunbeam-Velocette – CEANDESS Style 3/32″ Thickness

FUEL CAP GASKET

– CEANDESS  STYLE

FITS:

CEANDESS style gas / fuel filler cap 2 1/2″ for:

Triumph:                 1938 – 1985

BSA:                           1939 – 1972

Matchless:             1946 – 1967

Norton:                     1946 – 1975

Ariel:                          1954 – 1970

AJS / AMC:            1938 – 1966

Royal Enfield:      1938 – 1968

Sunbeam:               1938 – 1956

Velocette:              1946 – 1968

Will also fit the following VEHICLES with 2 1/2″ CEANDESS style fuel cap:

Rolls Royce Lotus

Daimler Jensen – Healey

Morris Leyland

Rover Land Rover

BMC Range Rover

Jaguar Vauxhall

MG

Part #:    RG-400-3/32

Size:    2 1/2″ OD  x  1 7/8″ ID  x  3/32″ thick.

1 each

THIS GASKET IS also AVAILABLE IN  1/8″ THICKNESS – PART # RG-400-1/8

Please measure your gasket to be sure this is the correct fit

and thickness for your fuel cap.

** NEW & IMPROVED **

This gasket is made of  VITON  which has an excellent resistance

to oils, fuels, lubricants, and most mineral acids.

Viton provides excellent performance in high temperature environments.

Does not swell up.

Reusable.

Proudly made in the USA.

The post Fuel Cap Gasket for Triumph-BSA-Matchless-Norton-Ariel-AJS/AMC-Royal Enfield-Sunbeam-Velocette – CEANDESS Style 3/32″ Thickness appeared first on Silicone Gaskets - Real Gaskets Tennessee.